CREATE TABLE `Networksection` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `network_id` int(11) NOT NULL,
  `name` varchar(1024) COLLATE utf8mb4_unicode_520_ci NOT NULL,
  `create_by` int(11) NOT NULL,
  `edit_by` int(11) NOT NULL,
  `create` int(10) NOT NULL,
  `edit` int(10) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_520_ci;

ALTER TABLE `Building` CHANGE `description` `description` TEXT CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_520_ci NULL DEFAULT NULL;
ALTER TABLE `Building` ADD `networksection_id` INT NULL DEFAULT NULL AFTER `lineworker_id`;
